/*
// -----------------------------------------------------------------------
// 
// Copyright (c) 2001-2013, MeVis Medical Solutions AG, Bremen, Germany
// All rights reserved.
// 
// Redistribution and use in source and binary forms, with or without
// modification, are permitted provided that the following conditions are met:
//     * Redistributions of source code must retain the above copyright
//       notice, this list of conditions and the following disclaimer.
//     * Redistributions in binary form must reproduce the above copyright
//       notice, this list of conditions and the following disclaimer in the
//       documentation and/or other materials provided with the distribution.
//     * Neither the name of MeVis Medical Solutions AG nor the
//       names of its contributors may be used to endorse or promote products
//       derived from this software without specific prior written permission.
// 
// THIS SOFTWARE IS PROVIDED BY MEVIS MEDICAL SOLUTIONS AG ''AS IS'' AND ANY
// EXPRESS OR IMPLIED WARRANTIES, INCLUDING, BUT NOT LIMITED TO, THE IMPLIED
// WARRANTIES OF MERCHANTABILITY AND FITNESS FOR A PARTICULAR PURPOSE ARE
// DISCLAIMED. IN NO EVENT SHALL MEVIS MEDICAL SOLUTIONS AG BE LIABLE FOR ANY
// DIRECT, INDIRECT, INCIDENTAL, SPECIAL, EXEMPLARY, OR CONSEQUENTIAL DAMAGES
// (INCLUDING, BUT NOT LIMITED TO, PROCUREMENT OF SUBSTITUTE GOODS OR SERVICES;
// LOSS OF USE, DATA, OR PROFITS; OR BUSINESS INTERRUPTION) HOWEVER CAUSED AND
// ON ANY THEORY OF LIABILITY, WHETHER IN CONTRACT, STRICT LIABILITY, OR TORT
// (INCLUDING NEGLIGENCE OR OTHERWISE) ARISING IN ANY WAY OUT OF THE USE OF THIS
// SOFTWARE, EVEN IF ADVISED OF THE POSSIBILITY OF SUCH DAMAGE.
*/


InventorModule SoRenderArea {
  DLL                = SoViewers
  genre              = View3D
  author             = "Florian Link"
  keywords           = "inventor viewer 3D"
  comment            = "Simple viewer with no interaction, nice to use with SoView2D"
  seeAlso            = "SoExaminerViewer SoView2D"
  exampleNetwork     = $(LOCAL)/networks/SoRenderArea.mlab
  externalDefinition = $(LOCAL)/SoRenderArea.script
}


InventorModule SoExaminerViewer {
  DLL                = SoViewers
  genre              = View3D
  author             = "Florian Link"
  keywords           = "rendering scene movie recording navigation zoom 3D"
  comment            = "The examiner viewer is used to view an OpenInventor scene graph. It stores the current settings and the camera position"
  seeAlso            = "SoCustomExaminerViewer SoRenderArea"
  exampleNetwork     = $(LOCAL)/networks/SoExaminerViewer.mlab
  externalDefinition = $(LOCAL)/SoExaminerViewer.script
}


//# MeVis signature v1
//# key: MFowDQYJKoZIhvcNAQEBBQADSQAwRgJBANEfsmYse2e1dRhkQ9AQbreCq9uxwzWLoGom13MNYmyfwoJqQOEXljLFAgw2eEjaT12G4CdqKWhRxh9ANP6n7GMCARE=:VI/mB8bT4u+mRtf/ru8yUQi8BzpaS3UeL2x62YxsUYnVqCWuLrVNLiukIIjnJMKQXlc8ezmgOIcVAV7pgvgKpQ==
//# owner: MeVis
//# date: 2013-02-08T09:00:39
//# hash: A83bL+PTkJD5VLHEp/pdupb9m6pyukeKlwwPJFd0sCHCB4RVs21WYltx21j78BHcYZjHdLHbVn1JSGg4f/wtYQ==
//# MeVis end
